)c (GeV/ Tp 2 4 6 8 10 12

2v/_3v

0

0.5

1 = 5.02 TeV NNs Pb-Pb 5-40%

)c (GeV/ Tp 2 4 6 8 10 12

2v/_3v

0

0.5

1 <4.0, ALICEy, 2.5<ψInclusive J/ |<1.0, CMS y, |^0

Prompt D |<0.8, ALICE η, |^±h

10-50%